# Automatically generated by ./create_def.pl, do not edit
#Stream function
'1' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 35 ;
	}
#Velocity potential
'2' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 36 ;
	}
#Potential temperature
'3' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 13 ;
	}
#Wind speed
'10' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 32 ;
	}
#Pressure
'54' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 1 ;
	}
#Potential vorticity
'60' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 4 ;
	}
#Maximum temperature at 2 metres in the last 6 hours
'121' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 15 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Minimum temperature at 2 metres in the last 6 hours
'122' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 16 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Geopotential
'129' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 6 ;
	}
#Temperature
'130' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 11 ;
	}
#U component of wind
'131' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 33 ;
	}
#V component of wind
'132' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 34 ;
	}
#Specific humidity
'133' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 51 ;
	}
#Surface pressure
'134' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 1 ;
	 indicatorOfTypeOfLevel = 1 ;
	}
#Vertical velocity
'135' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 39 ;
	}
#Vorticity (relative)
'138' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 43 ;
	}
#Mean sea level pressure
'151' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 2 ;
	}
#Divergence
'155' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 44 ;
	}
#Geopotential height
'156' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 7 ;
	}
#Relative humidity
'157' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 52 ;
	}
#10 metre U wind component
'165' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 33 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 10 ;
	}
#10 metre V wind component
'166' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 34 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 10 ;
	}
#2 metre temperature
'167' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 11 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#2 metre dewpoint temperature
'168' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 17 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Land-sea mask
'172' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 81 ;
	}
#Surface roughness (climatological)
'173' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 83 ;
	}
#Evaporation
'182' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 57 ;
	}
#Brightness temperature
'194' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 118 ;
	}
#Runoff
'205' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 90 ;
	}
#Total column ozone
'206' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 10 ;
	}
#Large-scale precipitation
'3062' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 62 ;
	}
#Snow depth
'3066' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 66 ;
	}
#Convective cloud cover
'3072' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 72 ;
	}
#Low cloud cover
'3073' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 73 ;
	}
#Medium cloud cover
'3074' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 74 ;
	}
#High cloud cover
'3075' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 75 ;
	}
#Large scale snow
'3079' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 79 ;
	}
#Latent heat flux
'3121' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 121 ;
	}
#Sensible heat flux
'3122' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 122 ;
	}
#Boundary layer dissipation
'3123' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 123 ;
	}
#Convective snow
'260011' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 78 ;
	}
#Cloud water
'260102' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 76 ;
	}
#Forecast albedo
'260509' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 84 ;
	}
#Virtual temperature
'300012' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 12 ;
	}
#Virtual temperature
'300012' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 12 ;
	}
#Virtual temperature
'300012' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 12 ;
	}
#Pressure tendency
'3003' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 3 ;
	}
#ICAO Standard Atmosphere reference height
'3005' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 5 ;
	}
#Geometrical height
'3008' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 8 ;
	}
#Standard deviation of height
'3009' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 9 ;
	}
#Pseudo-adiabatic potential temperature
'3014' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 14 ;
	}
#Maximum temperature
'3015' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 15 ;
	}
#Minimum temperature
'3016' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 16 ;
	}
#Dew point temperature
'3017' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 17 ;
	}
#Dew point depression (or deficit)
'3018' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 18 ;
	}
#Lapse rate
'3019' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 19 ;
	}
#Visibility
'3020' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 20 ;
	}
#Radar spectra (1)
'3021' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 21 ;
	}
#Radar spectra (2)
'3022' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 22 ;
	}
#Radar spectra (3)
'3023' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 23 ;
	}
#Parcel lifted index (to 500 hPa)
'3024' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 24 ;
	}
#Temperature anomaly
'3025' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 25 ;
	}
#Pressure anomaly
'3026' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 26 ;
	}
#Geopotential height anomaly
'3027' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 27 ;
	}
#Wave spectra (1)
'3028' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 28 ;
	}
#Wave spectra (2)
'3029' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 29 ;
	}
#Wave spectra (3)
'3030' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 30 ;
	}
#Wind direction
'3031' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 31 ;
	}
#Montgomery stream Function
'3037' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 37 ;
	}
#Sigma coordinate vertical velocity
'3038' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 38 ;
	}
#Absolute vorticity
'3041' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 41 ;
	}
#Absolute divergence
'3042' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 42 ;
	}
#Vertical u-component shear
'3045' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 45 ;
	}
#Vertical v-component shear
'3046' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 46 ;
	}
#Direction of current
'3047' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 47 ;
	}
#Speed of current
'3048' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 48 ;
	}
#U-component of current
'3049' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 49 ;
	}
#V-component of current
'3050' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 50 ;
	}
#Humidity mixing ratio
'3053' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 53 ;
	}
#Precipitable water
'3054' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 54 ;
	}
#Vapour pressure
'3055' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 55 ;
	}
#Saturation deficit
'3056' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 56 ;
	}
#Precipitation rate
'3059' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 59 ;
	}
#Thunderstorm probability
'3060' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 60 ;
	}
#Convective precipitation (water)
'3063' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 63 ;
	}
#Snow fall rate water equivalent
'3064' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 64 ;
	}
#Mixed layer depth
'3067' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 67 ;
	}
#Transient thermocline depth
'3068' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 68 ;
	}
#Main thermocline depth
'3069' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 69 ;
	}
#Main thermocline anomaly
'3070' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 70 ;
	}
#Best lifted index (to 500 hPa)
'3077' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 77 ;
	}
#Water temperature
'3080' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 80 ;
	}
#Deviation of sea-level from mean
'3082' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 82 ;
	}
#Soil moisture content
'3086' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 86 ;
	}
#Salinity
'3088' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 88 ;
	}
#Density
'3089' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 89 ;
	}
#Ice cover (1=ice, 0=no ice)
'3091' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 91 ;
	}
#Ice thickness
'3092' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 92 ;
	}
#Direction of ice drift
'3093' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 93 ;
	}
#Speed of ice drift
'3094' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 94 ;
	}
#U-component of ice drift
'3095' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 95 ;
	}
#V-component of ice drift
'3096' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 96 ;
	}
#Ice growth rate
'3097' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 97 ;
	}
#Ice divergence
'3098' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 98 ;
	}
#Snowmelt
'3099' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 99 ;
	}
#Signific.height,combined wind waves+swell
'3100' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 100 ;
	}
#Mean direction of wind waves
'3101' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 101 ;
	}
#Significant height of wind waves
'3102' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 102 ;
	}
#Mean period of wind waves
'3103' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 103 ;
	}
#Direction of swell waves
'3104' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 104 ;
	}
#Significant height of swell waves
'3105' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 105 ;
	}
#Mean period of swell waves
'3106' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 106 ;
	}
#Primary wave direction
'3107' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 107 ;
	}
#Primary wave mean period
'3108' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 108 ;
	}
#Secondary wave direction
'3109' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 109 ;
	}
#Secondary wave mean period
'3110' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 110 ;
	}
#Net short-wave radiation flux (surface)
'3111' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 111 ;
	}
#Net long-wave radiation flux (surface)
'3112' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 112 ;
	}
#Net short-wave radiation flux(atmosph.top)
'3113' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 113 ;
	}
#Net long-wave radiation flux(atmosph.top)
'3114' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 114 ;
	}
#Long wave radiation flux
'3115' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 115 ;
	}
#Short wave radiation flux
'3116' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 116 ;
	}
#Global radiation flux
'3117' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 117 ;
	}
#Radiance (with respect to wave number)
'3119' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 119 ;
	}
#Radiance (with respect to wave length)
'3120' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 120 ;
	}
#Momentum flux, u-component
'3124' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 124 ;
	}
#Momentum flux, v-component
'3125' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 125 ;
	}
#Wind mixing energy
'3126' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 126 ;
	}
#Image data
'3127' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 127 ;
	}
#Percentage of vegetation
'160199' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 87 ;
	}
#Orography
'228002' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 7 ;
	 indicatorOfTypeOfLevel = 1 ;
	}
#Soil moisture
'228039' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 86 ;
	}
#Soil temperature
'228139' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 85 ;
	}
#Snowfall water equivalent
'228144' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 65 ;
	}
#Total Cloud Cover
'228164' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 71 ;
	}
#Total Precipitation
'228228' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 61 ;
	 indicatorOfTypeOfLevel = 1 ;
	 level = 0 ;
	}
#Stream function
'1' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 35 ;
	}
#Velocity potential
'2' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 36 ;
	}
#Potential temperature
'3' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 13 ;
	}
#Wind speed
'10' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 32 ;
	}
#Pressure
'54' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 1 ;
	}
#Potential vorticity
'60' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 4 ;
	}
#Maximum temperature at 2 metres in the last 6 hours
'121' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 15 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Minimum temperature at 2 metres in the last 6 hours
'122' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 16 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Geopotential
'129' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 6 ;
	}
#Temperature
'130' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 11 ;
	}
#U component of wind
'131' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 33 ;
	}
#V component of wind
'132' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 34 ;
	}
#Specific humidity
'133' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 51 ;
	}
#Surface pressure
'134' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 1 ;
	 indicatorOfTypeOfLevel = 1 ;
	}
#Vertical velocity
'135' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 39 ;
	}
#Vorticity (relative)
'138' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 43 ;
	}
#Mean sea level pressure
'151' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 2 ;
	}
#Divergence
'155' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 44 ;
	}
#Geopotential height
'156' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 7 ;
	}
#Relative humidity
'157' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 52 ;
	}
#10 metre U wind component
'165' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 33 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 10 ;
	}
#10 metre V wind component
'166' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 34 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 10 ;
	}
#2 metre temperature
'167' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 11 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#2 metre dewpoint temperature
'168' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 17 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Land-sea mask
'172' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 81 ;
	}
#Surface roughness (climatological)
'173' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 83 ;
	}
#Evaporation
'182' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 57 ;
	}
#Brightness temperature
'194' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 118 ;
	}
#Runoff
'205' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 90 ;
	}
#Total column ozone
'206' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 10 ;
	}
#Large-scale precipitation
'3062' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 62 ;
	}
#Snow depth
'3066' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 66 ;
	}
#Convective cloud cover
'3072' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 72 ;
	}
#Low cloud cover
'3073' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 73 ;
	}
#Medium cloud cover
'3074' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 74 ;
	}
#High cloud cover
'3075' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 75 ;
	}
#Large scale snow
'3079' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 79 ;
	}
#Latent heat flux
'3121' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 121 ;
	}
#Sensible heat flux
'3122' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 122 ;
	}
#Boundary layer dissipation
'3123' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 123 ;
	}
#Convective snow
'260011' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 78 ;
	}
#Cloud water
'260102' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 76 ;
	}
#Forecast albedo
'260509' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 84 ;
	}
#Pressure tendency
'3003' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 3 ;
	}
#ICAO Standard Atmosphere reference height
'3005' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 5 ;
	}
#Geometrical height
'3008' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 8 ;
	}
#Standard deviation of height
'3009' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 9 ;
	}
#Pseudo-adiabatic potential temperature
'3014' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 14 ;
	}
#Maximum temperature
'3015' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 15 ;
	}
#Minimum temperature
'3016' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 16 ;
	}
#Dew point temperature
'3017' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 17 ;
	}
#Dew point depression (or deficit)
'3018' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 18 ;
	}
#Lapse rate
'3019' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 19 ;
	}
#Visibility
'3020' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 20 ;
	}
#Radar spectra (1)
'3021' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 21 ;
	}
#Radar spectra (2)
'3022' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 22 ;
	}
#Radar spectra (3)
'3023' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 23 ;
	}
#Parcel lifted index (to 500 hPa)
'3024' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 24 ;
	}
#Temperature anomaly
'3025' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 25 ;
	}
#Pressure anomaly
'3026' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 26 ;
	}
#Geopotential height anomaly
'3027' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 27 ;
	}
#Wave spectra (1)
'3028' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 28 ;
	}
#Wave spectra (2)
'3029' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 29 ;
	}
#Wave spectra (3)
'3030' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 30 ;
	}
#Wind direction
'3031' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 31 ;
	}
#Montgomery stream Function
'3037' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 37 ;
	}
#Sigma coordinate vertical velocity
'3038' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 38 ;
	}
#Absolute vorticity
'3041' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 41 ;
	}
#Absolute divergence
'3042' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 42 ;
	}
#Vertical u-component shear
'3045' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 45 ;
	}
#Vertical v-component shear
'3046' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 46 ;
	}
#Direction of current
'3047' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 47 ;
	}
#Speed of current
'3048' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 48 ;
	}
#U-component of current
'3049' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 49 ;
	}
#V-component of current
'3050' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 50 ;
	}
#Humidity mixing ratio
'3053' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 53 ;
	}
#Precipitable water
'3054' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 54 ;
	}
#Vapour pressure
'3055' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 55 ;
	}
#Saturation deficit
'3056' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 56 ;
	}
#Precipitation rate
'3059' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 59 ;
	}
#Thunderstorm probability
'3060' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 60 ;
	}
#Convective precipitation (water)
'3063' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 63 ;
	}
#Snow fall rate water equivalent
'3064' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 64 ;
	}
#Mixed layer depth
'3067' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 67 ;
	}
#Transient thermocline depth
'3068' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 68 ;
	}
#Main thermocline depth
'3069' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 69 ;
	}
#Main thermocline anomaly
'3070' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 70 ;
	}
#Best lifted index (to 500 hPa)
'3077' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 77 ;
	}
#Water temperature
'3080' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 80 ;
	}
#Deviation of sea-level from mean
'3082' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 82 ;
	}
#Soil moisture content
'3086' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 86 ;
	}
#Salinity
'3088' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 88 ;
	}
#Density
'3089' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 89 ;
	}
#Ice cover (1=ice, 0=no ice)
'3091' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 91 ;
	}
#Ice thickness
'3092' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 92 ;
	}
#Direction of ice drift
'3093' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 93 ;
	}
#Speed of ice drift
'3094' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 94 ;
	}
#U-component of ice drift
'3095' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 95 ;
	}
#V-component of ice drift
'3096' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 96 ;
	}
#Ice growth rate
'3097' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 97 ;
	}
#Ice divergence
'3098' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 98 ;
	}
#Snowmelt
'3099' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 99 ;
	}
#Signific.height,combined wind waves+swell
'3100' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 100 ;
	}
#Mean direction of wind waves
'3101' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 101 ;
	}
#Significant height of wind waves
'3102' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 102 ;
	}
#Mean period of wind waves
'3103' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 103 ;
	}
#Direction of swell waves
'3104' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 104 ;
	}
#Significant height of swell waves
'3105' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 105 ;
	}
#Mean period of swell waves
'3106' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 106 ;
	}
#Primary wave direction
'3107' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 107 ;
	}
#Primary wave mean period
'3108' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 108 ;
	}
#Secondary wave direction
'3109' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 109 ;
	}
#Secondary wave mean period
'3110' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 110 ;
	}
#Net short-wave radiation flux (surface)
'3111' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 111 ;
	}
#Net long-wave radiation flux (surface)
'3112' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 112 ;
	}
#Net short-wave radiation flux(atmosph.top)
'3113' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 113 ;
	}
#Net long-wave radiation flux(atmosph.top)
'3114' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 114 ;
	}
#Long wave radiation flux
'3115' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 115 ;
	}
#Short wave radiation flux
'3116' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 116 ;
	}
#Global radiation flux
'3117' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 117 ;
	}
#Radiance (with respect to wave number)
'3119' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 119 ;
	}
#Radiance (with respect to wave length)
'3120' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 120 ;
	}
#Momentum flux, u-component
'3124' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 124 ;
	}
#Momentum flux, v-component
'3125' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 125 ;
	}
#Wind mixing energy
'3126' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 126 ;
	}
#Image data
'3127' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 127 ;
	}
#Percentage of vegetation
'160199' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 87 ;
	}
#Orography
'228002' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 7 ;
	 indicatorOfTypeOfLevel = 1 ;
	}
#Soil moisture
'228039' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 86 ;
	}
#Soil temperature
'228139' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 85 ;
	}
#Snowfall water equivalent
'228144' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 65 ;
	}
#Total Cloud Cover
'228164' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 71 ;
	}
#Total Precipitation
'228228' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 61 ;
	 indicatorOfTypeOfLevel = 1 ;
	 level = 0 ;
	}
#Stream function
'1' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 35 ;
	}
#Velocity potential
'2' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 36 ;
	}
#Potential temperature
'3' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 13 ;
	}
#Wind speed
'10' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 32 ;
	}
#Pressure
'54' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 1 ;
	}
#Potential vorticity
'60' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 4 ;
	}
#Maximum temperature at 2 metres in the last 6 hours
'121' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 15 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Minimum temperature at 2 metres in the last 6 hours
'122' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 16 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Geopotential
'129' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 6 ;
	}
#Temperature
'130' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 11 ;
	}
#U component of wind
'131' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 33 ;
	}
#V component of wind
'132' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 34 ;
	}
#Specific humidity
'133' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 51 ;
	}
#Surface pressure
'134' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 1 ;
	 indicatorOfTypeOfLevel = 1 ;
	}
#Vertical velocity
'135' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 39 ;
	}
#Vorticity (relative)
'138' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 43 ;
	}
#Mean sea level pressure
'151' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 2 ;
	}
#Divergence
'155' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 44 ;
	}
#Geopotential height
'156' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 7 ;
	}
#Relative humidity
'157' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 52 ;
	}
#10 metre U wind component
'165' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 33 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 10 ;
	}
#10 metre V wind component
'166' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 34 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 10 ;
	}
#2 metre temperature
'167' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 11 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#2 metre dewpoint temperature
'168' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 17 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Land-sea mask
'172' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 81 ;
	}
#Surface roughness (climatological)
'173' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 83 ;
	}
#Evaporation
'182' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 57 ;
	}
#Brightness temperature
'194' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 118 ;
	}
#Runoff
'205' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 90 ;
	}
#Total column ozone
'206' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 10 ;
	}
#Large-scale precipitation
'3062' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 62 ;
	}
#Snow depth
'3066' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 66 ;
	}
#Convective cloud cover
'3072' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 72 ;
	}
#Low cloud cover
'3073' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 73 ;
	}
#Medium cloud cover
'3074' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 74 ;
	}
#High cloud cover
'3075' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 75 ;
	}
#Large scale snow
'3079' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 79 ;
	}
#Latent heat flux
'3121' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 121 ;
	}
#Sensible heat flux
'3122' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 122 ;
	}
#Boundary layer dissipation
'3123' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 123 ;
	}
#Convective snow
'260011' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 78 ;
	}
#Cloud water
'260102' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 76 ;
	}
#Forecast albedo
'260509' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 84 ;
	}
#Pressure tendency
'3003' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 3 ;
	}
#ICAO Standard Atmosphere reference height
'3005' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 5 ;
	}
#Geometrical height
'3008' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 8 ;
	}
#Standard deviation of height
'3009' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 9 ;
	}
#Pseudo-adiabatic potential temperature
'3014' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 14 ;
	}
#Maximum temperature
'3015' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 15 ;
	}
#Minimum temperature
'3016' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 16 ;
	}
#Dew point temperature
'3017' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 17 ;
	}
#Dew point depression (or deficit)
'3018' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 18 ;
	}
#Lapse rate
'3019' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 19 ;
	}
#Visibility
'3020' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 20 ;
	}
#Radar spectra (1)
'3021' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 21 ;
	}
#Radar spectra (2)
'3022' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 22 ;
	}
#Radar spectra (3)
'3023' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 23 ;
	}
#Parcel lifted index (to 500 hPa)
'3024' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 24 ;
	}
#Temperature anomaly
'3025' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 25 ;
	}
#Pressure anomaly
'3026' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 26 ;
	}
#Geopotential height anomaly
'3027' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 27 ;
	}
#Wave spectra (1)
'3028' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 28 ;
	}
#Wave spectra (2)
'3029' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 29 ;
	}
#Wave spectra (3)
'3030' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 30 ;
	}
#Wind direction
'3031' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 31 ;
	}
#Montgomery stream Function
'3037' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 37 ;
	}
#Sigma coordinate vertical velocity
'3038' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 38 ;
	}
#Absolute vorticity
'3041' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 41 ;
	}
#Absolute divergence
'3042' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 42 ;
	}
#Vertical u-component shear
'3045' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 45 ;
	}
#Vertical v-component shear
'3046' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 46 ;
	}
#Direction of current
'3047' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 47 ;
	}
#Speed of current
'3048' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 48 ;
	}
#U-component of current
'3049' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 49 ;
	}
#V-component of current
'3050' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 50 ;
	}
#Humidity mixing ratio
'3053' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 53 ;
	}
#Precipitable water
'3054' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 54 ;
	}
#Vapour pressure
'3055' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 55 ;
	}
#Saturation deficit
'3056' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 56 ;
	}
#Precipitation rate
'3059' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 59 ;
	}
#Thunderstorm probability
'3060' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 60 ;
	}
#Convective precipitation (water)
'3063' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 63 ;
	}
#Snow fall rate water equivalent
'3064' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 64 ;
	}
#Mixed layer depth
'3067' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 67 ;
	}
#Transient thermocline depth
'3068' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 68 ;
	}
#Main thermocline depth
'3069' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 69 ;
	}
#Main thermocline anomaly
'3070' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 70 ;
	}
#Best lifted index (to 500 hPa)
'3077' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 77 ;
	}
#Water temperature
'3080' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 80 ;
	}
#Deviation of sea-level from mean
'3082' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 82 ;
	}
#Soil moisture content
'3086' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 86 ;
	}
#Salinity
'3088' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 88 ;
	}
#Density
'3089' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 89 ;
	}
#Ice cover (1=ice, 0=no ice)
'3091' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 91 ;
	}
#Ice thickness
'3092' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 92 ;
	}
#Direction of ice drift
'3093' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 93 ;
	}
#Speed of ice drift
'3094' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 94 ;
	}
#U-component of ice drift
'3095' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 95 ;
	}
#V-component of ice drift
'3096' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 96 ;
	}
#Ice growth rate
'3097' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 97 ;
	}
#Ice divergence
'3098' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 98 ;
	}
#Snowmelt
'3099' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 99 ;
	}
#Signific.height,combined wind waves+swell
'3100' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 100 ;
	}
#Mean direction of wind waves
'3101' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 101 ;
	}
#Significant height of wind waves
'3102' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 102 ;
	}
#Mean period of wind waves
'3103' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 103 ;
	}
#Direction of swell waves
'3104' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 104 ;
	}
#Significant height of swell waves
'3105' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 105 ;
	}
#Mean period of swell waves
'3106' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 106 ;
	}
#Primary wave direction
'3107' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 107 ;
	}
#Primary wave mean period
'3108' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 108 ;
	}
#Secondary wave direction
'3109' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 109 ;
	}
#Secondary wave mean period
'3110' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 110 ;
	}
#Net short-wave radiation flux (surface)
'3111' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 111 ;
	}
#Net long-wave radiation flux (surface)
'3112' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 112 ;
	}
#Net short-wave radiation flux(atmosph.top)
'3113' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 113 ;
	}
#Net long-wave radiation flux(atmosph.top)
'3114' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 114 ;
	}
#Long wave radiation flux
'3115' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 115 ;
	}
#Short wave radiation flux
'3116' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 116 ;
	}
#Global radiation flux
'3117' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 117 ;
	}
#Radiance (with respect to wave number)
'3119' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 119 ;
	}
#Radiance (with respect to wave length)
'3120' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 120 ;
	}
#Momentum flux, u-component
'3124' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 124 ;
	}
#Momentum flux, v-component
'3125' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 125 ;
	}
#Wind mixing energy
'3126' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 126 ;
	}
#Image data
'3127' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 127 ;
	}
#Percentage of vegetation
'160199' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 87 ;
	}
#Orography
'228002' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 7 ;
	 indicatorOfTypeOfLevel = 1 ;
	}
#Soil moisture
'228039' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 86 ;
	}
#Soil temperature
'228139' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 85 ;
	}
#Snowfall water equivalent
'228144' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 65 ;
	}
#Total Cloud Cover
'228164' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 71 ;
	}
#Total Precipitation
'228228' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 61 ;
	 indicatorOfTypeOfLevel = 1 ;
	 level = 0 ;
}
