# Automatically generated by ./create_def.pl, do not edit
#Stream function
'strf' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 35 ;
	}
#Velocity potential
'vp' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 36 ;
	}
#Potential temperature
'pt' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 13 ;
	}
#Wind speed
'ws' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 32 ;
	}
#Pressure
'pres' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 1 ;
	}
#Potential vorticity
'pv' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 4 ;
	}
#Maximum temperature at 2 metres in the last 6 hours
'mx2t6' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 15 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Minimum temperature at 2 metres in the last 6 hours
'mn2t6' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 16 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Geopotential
'z' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 6 ;
	}
#Temperature
't' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 11 ;
	}
#U component of wind
'u' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 33 ;
	}
#V component of wind
'v' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 34 ;
	}
#Specific humidity
'q' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 51 ;
	}
#Surface pressure
'sp' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 1 ;
	 indicatorOfTypeOfLevel = 1 ;
	}
#Vertical velocity
'w' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 39 ;
	}
#Vorticity (relative)
'vo' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 43 ;
	}
#Mean sea level pressure
'msl' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 2 ;
	}
#Divergence
'd' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 44 ;
	}
#Geopotential height
'gh' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 7 ;
	}
#Relative humidity
'r' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 52 ;
	}
#10 metre U wind component
'u10' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 33 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 10 ;
	}
#10 metre V wind component
'v10' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 34 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 10 ;
	}
#2 metre temperature
't2m' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 11 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#2 metre dewpoint temperature
'd2m' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 17 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Land-sea mask
'lsm' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 81 ;
	}
#Surface roughness (climatological)
'sr' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 83 ;
	}
#Evaporation
'e' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 57 ;
	}
#Brightness temperature
'btmp' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 118 ;
	}
#Runoff
'ro' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 90 ;
	}
#Total column ozone
'tco3' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 10 ;
	}
#Large-scale precipitation
'lsp' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 62 ;
	}
#Snow depth
'sde' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 66 ;
	}
#Convective cloud cover
'ccc' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 72 ;
	}
#Low cloud cover
'lcc' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 73 ;
	}
#Medium cloud cover
'mcc' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 74 ;
	}
#High cloud cover
'hcc' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 75 ;
	}
#Large scale snow
'lssf' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 79 ;
	}
#Latent heat flux
'lhf' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 121 ;
	}
#Sensible heat flux
'shf' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 122 ;
	}
#Boundary layer dissipation
'bld' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 123 ;
	}
#Convective snow
'snoc' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 78 ;
	}
#Cloud water
'p260102' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 76 ;
	}
#Forecast albedo
'al' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 84 ;
	}
#Virtual temperature
'p300012' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 12 ;
	}
#Virtual temperature
'p300012' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 12 ;
	}
#Virtual temperature
'p300012' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 12 ;
	}
#Pressure tendency
'p3003' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 3 ;
	}
#ICAO Standard Atmosphere reference height
'p3005' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 5 ;
	}
#Geometrical height
'p3008' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 8 ;
	}
#Standard deviation of height
'p3009' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 9 ;
	}
#Pseudo-adiabatic potential temperature
'p3014' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 14 ;
	}
#Maximum temperature
'p3015' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 15 ;
	}
#Minimum temperature
'p3016' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 16 ;
	}
#Dew point temperature
'p3017' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 17 ;
	}
#Dew point depression (or deficit)
'p3018' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 18 ;
	}
#Lapse rate
'p3019' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 19 ;
	}
#Visibility
'p3020' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 20 ;
	}
#Radar spectra (1)
'p3021' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 21 ;
	}
#Radar spectra (2)
'p3022' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 22 ;
	}
#Radar spectra (3)
'p3023' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 23 ;
	}
#Parcel lifted index (to 500 hPa)
'p3024' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 24 ;
	}
#Temperature anomaly
'p3025' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 25 ;
	}
#Pressure anomaly
'p3026' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 26 ;
	}
#Geopotential height anomaly
'p3027' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 27 ;
	}
#Wave spectra (1)
'p3028' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 28 ;
	}
#Wave spectra (2)
'p3029' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 29 ;
	}
#Wave spectra (3)
'p3030' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 30 ;
	}
#Wind direction
'p3031' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 31 ;
	}
#Montgomery stream Function
'p3037' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 37 ;
	}
#Sigma coordinate vertical velocity
'p3038' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 38 ;
	}
#Absolute vorticity
'p3041' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 41 ;
	}
#Absolute divergence
'p3042' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 42 ;
	}
#Vertical u-component shear
'p3045' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 45 ;
	}
#Vertical v-component shear
'p3046' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 46 ;
	}
#Direction of current
'p3047' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 47 ;
	}
#Speed of current
'p3048' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 48 ;
	}
#U-component of current 
'p3049' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 49 ;
	}
#V-component of current 
'p3050' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 50 ;
	}
#Humidity mixing ratio
'p3053' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 53 ;
	}
#Precipitable water
'p3054' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 54 ;
	}
#Vapour pressure
'p3055' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 55 ;
	}
#Saturation deficit
'p3056' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 56 ;
	}
#Precipitation rate
'p3059' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 59 ;
	}
#Thunderstorm probability
'p3060' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 60 ;
	}
#Convective precipitation (water)
'p3063' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 63 ;
	}
#Snow fall rate water equivalent
'p3064' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 64 ;
	}
#Mixed layer depth
'p3067' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 67 ;
	}
#Transient thermocline depth
'p3068' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 68 ;
	}
#Main thermocline depth
'p3069' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 69 ;
	}
#Main thermocline anomaly
'p3070' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 70 ;
	}
#Best lifted index (to 500 hPa)
'p3077' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 77 ;
	}
#Water temperature
'p3080' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 80 ;
	}
#Deviation of sea-level from mean
'p3082' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 82 ;
	}
#Soil moisture content
'p3086' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 86 ;
	}
#Salinity
'p3088' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 88 ;
	}
#Density
'p3089' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 89 ;
	}
#Ice cover (1=ice, 0=no ice)
'p3091' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 91 ;
	}
#Ice thickness
'p3092' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 92 ;
	}
#Direction of ice drift
'p3093' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 93 ;
	}
#Speed of ice drift
'p3094' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 94 ;
	}
#U-component of ice drift
'p3095' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 95 ;
	}
#V-component of ice drift
'p3096' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 96 ;
	}
#Ice growth rate
'p3097' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 97 ;
	}
#Ice divergence
'p3098' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 98 ;
	}
#Snowmelt
'snom' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 99 ;
	}
#Signific.height,combined wind waves+swell
'p3100' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 100 ;
	}
#Mean direction of wind waves
'p3101' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 101 ;
	}
#Significant height of wind waves
'p3102' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 102 ;
	}
#Mean period of wind waves
'p3103' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 103 ;
	}
#Direction of swell waves
'p3104' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 104 ;
	}
#Significant height of swell waves
'p3105' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 105 ;
	}
#Mean period of swell waves
'p3106' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 106 ;
	}
#Primary wave direction
'p3107' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 107 ;
	}
#Primary wave mean period
'p3108' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 108 ;
	}
#Secondary wave direction
'p3109' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 109 ;
	}
#Secondary wave mean period
'p3110' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 110 ;
	}
#Net short-wave radiation flux (surface)
'p3111' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 111 ;
	}
#Net long-wave radiation flux (surface)
'p3112' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 112 ;
	}
#Net short-wave radiation flux(atmosph.top)
'p3113' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 113 ;
	}
#Net long-wave radiation flux(atmosph.top)
'p3114' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 114 ;
	}
#Long wave radiation flux
'p3115' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 115 ;
	}
#Short wave radiation flux
'p3116' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 116 ;
	}
#Global radiation flux
'p3117' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 117 ;
	}
#Radiance (with respect to wave number)
'p3119' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 119 ;
	}
#Radiance (with respect to wave length)
'p3120' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 120 ;
	}
#Momentum flux, u-component
'p3124' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 124 ;
	}
#Momentum flux, v-component
'p3125' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 125 ;
	}
#Wind mixing energy
'p3126' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 126 ;
	}
#Image data
'p3127' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 127 ;
	}
#Percentage of vegetation
'vegrea' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 87 ;
	}
#Orography
'orog' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 7 ;
	 indicatorOfTypeOfLevel = 1 ;
	}
#Soil moisture
'sm' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 86 ;
	}
#Soil temperature
'st' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 85 ;
	}
#Snowfall water equivalent
'sf' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 65 ;
	}
#Total Cloud Cover
'tcc' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 71 ;
	}
#Total Precipitation
'tp' = {
	 table2Version = 3 ;
	 indicatorOfParameter = 61 ;
	 indicatorOfTypeOfLevel = 1 ;
	 level = 0 ;
	}
#Stream function
'strf' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 35 ;
	}
#Velocity potential
'vp' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 36 ;
	}
#Potential temperature
'pt' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 13 ;
	}
#Wind speed
'ws' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 32 ;
	}
#Pressure
'pres' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 1 ;
	}
#Potential vorticity
'pv' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 4 ;
	}
#Maximum temperature at 2 metres in the last 6 hours
'mx2t6' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 15 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Minimum temperature at 2 metres in the last 6 hours
'mn2t6' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 16 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Geopotential
'z' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 6 ;
	}
#Temperature
't' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 11 ;
	}
#U component of wind
'u' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 33 ;
	}
#V component of wind
'v' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 34 ;
	}
#Specific humidity
'q' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 51 ;
	}
#Surface pressure
'sp' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 1 ;
	 indicatorOfTypeOfLevel = 1 ;
	}
#Vertical velocity
'w' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 39 ;
	}
#Vorticity (relative)
'vo' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 43 ;
	}
#Mean sea level pressure
'msl' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 2 ;
	}
#Divergence
'd' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 44 ;
	}
#Geopotential height
'gh' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 7 ;
	}
#Relative humidity
'r' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 52 ;
	}
#10 metre U wind component
'u10' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 33 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 10 ;
	}
#10 metre V wind component
'v10' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 34 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 10 ;
	}
#2 metre temperature
't2m' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 11 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#2 metre dewpoint temperature
'd2m' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 17 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Land-sea mask
'lsm' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 81 ;
	}
#Surface roughness (climatological)
'sr' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 83 ;
	}
#Evaporation
'e' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 57 ;
	}
#Brightness temperature
'btmp' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 118 ;
	}
#Runoff
'ro' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 90 ;
	}
#Total column ozone
'tco3' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 10 ;
	}
#Large-scale precipitation
'lsp' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 62 ;
	}
#Snow depth
'sd' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 66 ;
	}
#Convective cloud cover
'ccc' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 72 ;
	}
#Low cloud cover
'lcc' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 73 ;
	}
#Medium cloud cover
'mcc' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 74 ;
	}
#High cloud cover
'hcc' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 75 ;
	}
#Large scale snow
'lssf' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 79 ;
	}
#Latent heat flux
'lhf' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 121 ;
	}
#Sensible heat flux
'shf' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 122 ;
	}
#Boundary layer dissipation
'bld' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 123 ;
	}
#Convective snow
'snoc' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 78 ;
	}
#Cloud water
'p260102' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 76 ;
	}
#Forecast albedo
'al' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 84 ;
	}
#Pressure tendency
'p3003' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 3 ;
	}
#ICAO Standard Atmosphere reference height
'p3005' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 5 ;
	}
#Geometrical height
'p3008' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 8 ;
	}
#Standard deviation of height
'p3009' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 9 ;
	}
#Pseudo-adiabatic potential temperature
'p3014' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 14 ;
	}
#Maximum temperature
'p3015' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 15 ;
	}
#Minimum temperature
'p3016' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 16 ;
	}
#Dew point temperature
'p3017' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 17 ;
	}
#Dew point depression (or deficit)
'p3018' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 18 ;
	}
#Lapse rate
'p3019' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 19 ;
	}
#Visibility
'p3020' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 20 ;
	}
#Radar spectra (1)
'p3021' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 21 ;
	}
#Radar spectra (2)
'p3022' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 22 ;
	}
#Radar spectra (3)
'p3023' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 23 ;
	}
#Parcel lifted index (to 500 hPa)
'p3024' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 24 ;
	}
#Temperature anomaly
'p3025' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 25 ;
	}
#Pressure anomaly
'p3026' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 26 ;
	}
#Geopotential height anomaly
'p3027' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 27 ;
	}
#Wave spectra (1)
'p3028' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 28 ;
	}
#Wave spectra (2)
'p3029' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 29 ;
	}
#Wave spectra (3)
'p3030' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 30 ;
	}
#Wind direction
'p3031' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 31 ;
	}
#Montgomery stream Function
'p3037' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 37 ;
	}
#Sigma coordinate vertical velocity
'p3038' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 38 ;
	}
#Absolute vorticity
'p3041' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 41 ;
	}
#Absolute divergence
'p3042' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 42 ;
	}
#Vertical u-component shear
'p3045' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 45 ;
	}
#Vertical v-component shear
'p3046' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 46 ;
	}
#Direction of current
'p3047' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 47 ;
	}
#Speed of current
'p3048' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 48 ;
	}
#U-component of current 
'p3049' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 49 ;
	}
#V-component of current 
'p3050' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 50 ;
	}
#Humidity mixing ratio
'p3053' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 53 ;
	}
#Precipitable water
'p3054' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 54 ;
	}
#Vapour pressure
'p3055' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 55 ;
	}
#Saturation deficit
'p3056' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 56 ;
	}
#Precipitation rate
'p3059' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 59 ;
	}
#Thunderstorm probability
'p3060' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 60 ;
	}
#Convective precipitation (water)
'p3063' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 63 ;
	}
#Snow fall rate water equivalent
'p3064' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 64 ;
	}
#Mixed layer depth
'p3067' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 67 ;
	}
#Transient thermocline depth
'p3068' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 68 ;
	}
#Main thermocline depth
'p3069' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 69 ;
	}
#Main thermocline anomaly
'p3070' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 70 ;
	}
#Best lifted index (to 500 hPa)
'p3077' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 77 ;
	}
#Water temperature
'p3080' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 80 ;
	}
#Deviation of sea-level from mean
'p3082' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 82 ;
	}
#Soil moisture content
'p3086' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 86 ;
	}
#Salinity
'p3088' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 88 ;
	}
#Density
'p3089' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 89 ;
	}
#Ice cover (1=ice, 0=no ice)
'p3091' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 91 ;
	}
#Ice thickness
'p3092' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 92 ;
	}
#Direction of ice drift
'p3093' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 93 ;
	}
#Speed of ice drift
'p3094' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 94 ;
	}
#U-component of ice drift
'p3095' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 95 ;
	}
#V-component of ice drift
'p3096' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 96 ;
	}
#Ice growth rate
'p3097' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 97 ;
	}
#Ice divergence
'p3098' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 98 ;
	}
#Snowmelt
'snom' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 99 ;
	}
#Signific.height,combined wind waves+swell
'p3100' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 100 ;
	}
#Mean direction of wind waves
'p3101' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 101 ;
	}
#Significant height of wind waves
'p3102' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 102 ;
	}
#Mean period of wind waves
'p3103' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 103 ;
	}
#Direction of swell waves
'p3104' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 104 ;
	}
#Significant height of swell waves
'p3105' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 105 ;
	}
#Mean period of swell waves
'p3106' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 106 ;
	}
#Primary wave direction
'p3107' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 107 ;
	}
#Primary wave mean period
'p3108' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 108 ;
	}
#Secondary wave direction
'p3109' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 109 ;
	}
#Secondary wave mean period
'p3110' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 110 ;
	}
#Net short-wave radiation flux (surface)
'p3111' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 111 ;
	}
#Net long-wave radiation flux (surface)
'p3112' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 112 ;
	}
#Net short-wave radiation flux(atmosph.top)
'p3113' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 113 ;
	}
#Net long-wave radiation flux(atmosph.top)
'p3114' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 114 ;
	}
#Long wave radiation flux
'p3115' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 115 ;
	}
#Short wave radiation flux
'p3116' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 116 ;
	}
#Global radiation flux
'p3117' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 117 ;
	}
#Radiance (with respect to wave number)
'p3119' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 119 ;
	}
#Radiance (with respect to wave length)
'p3120' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 120 ;
	}
#Momentum flux, u-component
'p3124' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 124 ;
	}
#Momentum flux, v-component
'p3125' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 125 ;
	}
#Wind mixing energy
'p3126' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 126 ;
	}
#Image data
'p3127' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 127 ;
	}
#Percentage of vegetation
'vegrea' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 87 ;
	}
#Orography
'orog' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 7 ;
	 indicatorOfTypeOfLevel = 1 ;
	}
#Soil moisture
'sm' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 86 ;
	}
#Soil temperature
'st' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 85 ;
	}
#Snowfall water equivalent
'sf' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 65 ;
	}
#Total Cloud Cover
'tcc' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 71 ;
	}
#Total Precipitation
'tp' = {
	 table2Version = 2 ;
	 indicatorOfParameter = 61 ;
	 indicatorOfTypeOfLevel = 1 ;
	 level = 0 ;
	}
#Stream function
'strf' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 35 ;
	}
#Velocity potential
'vp' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 36 ;
	}
#Potential temperature
'pt' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 13 ;
	}
#Wind speed
'ws' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 32 ;
	}
#Pressure
'pres' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 1 ;
	}
#Potential vorticity
'pv' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 4 ;
	}
#Maximum temperature at 2 metres in the last 6 hours
'mx2t6' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 15 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Minimum temperature at 2 metres in the last 6 hours
'mn2t6' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 16 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Geopotential
'z' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 6 ;
	}
#Temperature
't' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 11 ;
	}
#U component of wind
'u' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 33 ;
	}
#V component of wind
'v' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 34 ;
	}
#Specific humidity
'q' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 51 ;
	}
#Surface pressure
'sp' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 1 ;
	 indicatorOfTypeOfLevel = 1 ;
	}
#Vertical velocity
'w' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 39 ;
	}
#Vorticity (relative)
'vo' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 43 ;
	}
#Mean sea level pressure
'msl' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 2 ;
	}
#Divergence
'd' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 44 ;
	}
#Geopotential height
'gh' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 7 ;
	}
#Relative humidity
'r' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 52 ;
	}
#10 metre U wind component
'u10' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 33 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 10 ;
	}
#10 metre V wind component
'v10' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 34 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 10 ;
	}
#2 metre temperature
't2m' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 11 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#2 metre dewpoint temperature
'd2m' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 17 ;
	 indicatorOfTypeOfLevel = 105 ;
	 level = 2 ;
	}
#Land-sea mask
'lsm' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 81 ;
	}
#Surface roughness (climatological)
'sr' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 83 ;
	}
#Evaporation
'e' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 57 ;
	}
#Brightness temperature
'btmp' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 118 ;
	}
#Runoff
'ro' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 90 ;
	}
#Total column ozone
'tco3' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 10 ;
	}
#Large-scale precipitation
'lsp' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 62 ;
	}
#Snow depth
'sd' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 66 ;
	}
#Convective cloud cover
'ccc' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 72 ;
	}
#Low cloud cover
'lcc' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 73 ;
	}
#Medium cloud cover
'mcc' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 74 ;
	}
#High cloud cover
'hcc' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 75 ;
	}
#Large scale snow
'lssf' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 79 ;
	}
#Latent heat flux
'lhf' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 121 ;
	}
#Sensible heat flux
'shf' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 122 ;
	}
#Boundary layer dissipation
'bld' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 123 ;
	}
#Convective snow
'snoc' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 78 ;
	}
#Cloud water
'p260102' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 76 ;
	}
#Forecast albedo
'al' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 84 ;
	}
#Pressure tendency
'p3003' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 3 ;
	}
#ICAO Standard Atmosphere reference height
'p3005' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 5 ;
	}
#Geometrical height
'p3008' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 8 ;
	}
#Standard deviation of height
'p3009' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 9 ;
	}
#Pseudo-adiabatic potential temperature
'p3014' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 14 ;
	}
#Maximum temperature
'p3015' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 15 ;
	}
#Minimum temperature
'p3016' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 16 ;
	}
#Dew point temperature
'p3017' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 17 ;
	}
#Dew point depression (or deficit)
'p3018' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 18 ;
	}
#Lapse rate
'p3019' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 19 ;
	}
#Visibility
'p3020' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 20 ;
	}
#Radar spectra (1)
'p3021' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 21 ;
	}
#Radar spectra (2)
'p3022' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 22 ;
	}
#Radar spectra (3)
'p3023' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 23 ;
	}
#Parcel lifted index (to 500 hPa)
'p3024' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 24 ;
	}
#Temperature anomaly
'p3025' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 25 ;
	}
#Pressure anomaly
'p3026' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 26 ;
	}
#Geopotential height anomaly
'p3027' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 27 ;
	}
#Wave spectra (1)
'p3028' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 28 ;
	}
#Wave spectra (2)
'p3029' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 29 ;
	}
#Wave spectra (3)
'p3030' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 30 ;
	}
#Wind direction
'p3031' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 31 ;
	}
#Montgomery stream Function
'p3037' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 37 ;
	}
#Sigma coordinate vertical velocity
'p3038' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 38 ;
	}
#Absolute vorticity
'p3041' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 41 ;
	}
#Absolute divergence
'p3042' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 42 ;
	}
#Vertical u-component shear
'p3045' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 45 ;
	}
#Vertical v-component shear
'p3046' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 46 ;
	}
#Direction of current
'p3047' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 47 ;
	}
#Speed of current
'p3048' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 48 ;
	}
#U-component of current 
'p3049' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 49 ;
	}
#V-component of current 
'p3050' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 50 ;
	}
#Humidity mixing ratio
'p3053' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 53 ;
	}
#Precipitable water
'p3054' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 54 ;
	}
#Vapour pressure
'p3055' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 55 ;
	}
#Saturation deficit
'p3056' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 56 ;
	}
#Precipitation rate
'p3059' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 59 ;
	}
#Thunderstorm probability
'p3060' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 60 ;
	}
#Convective precipitation (water)
'p3063' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 63 ;
	}
#Snow fall rate water equivalent
'p3064' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 64 ;
	}
#Mixed layer depth
'p3067' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 67 ;
	}
#Transient thermocline depth
'p3068' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 68 ;
	}
#Main thermocline depth
'p3069' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 69 ;
	}
#Main thermocline anomaly
'p3070' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 70 ;
	}
#Best lifted index (to 500 hPa)
'p3077' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 77 ;
	}
#Water temperature
'p3080' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 80 ;
	}
#Deviation of sea-level from mean
'p3082' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 82 ;
	}
#Soil moisture content
'p3086' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 86 ;
	}
#Salinity
'p3088' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 88 ;
	}
#Density
'p3089' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 89 ;
	}
#Ice cover (1=ice, 0=no ice)
'p3091' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 91 ;
	}
#Ice thickness
'p3092' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 92 ;
	}
#Direction of ice drift
'p3093' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 93 ;
	}
#Speed of ice drift
'p3094' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 94 ;
	}
#U-component of ice drift
'p3095' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 95 ;
	}
#V-component of ice drift
'p3096' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 96 ;
	}
#Ice growth rate
'p3097' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 97 ;
	}
#Ice divergence
'p3098' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 98 ;
	}
#Snowmelt
'snom' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 99 ;
	}
#Signific.height,combined wind waves+swell
'p3100' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 100 ;
	}
#Mean direction of wind waves
'p3101' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 101 ;
	}
#Significant height of wind waves
'p3102' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 102 ;
	}
#Mean period of wind waves
'p3103' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 103 ;
	}
#Direction of swell waves
'p3104' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 104 ;
	}
#Significant height of swell waves
'p3105' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 105 ;
	}
#Mean period of swell waves
'p3106' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 106 ;
	}
#Primary wave direction
'p3107' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 107 ;
	}
#Primary wave mean period
'p3108' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 108 ;
	}
#Secondary wave direction
'p3109' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 109 ;
	}
#Secondary wave mean period
'p3110' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 110 ;
	}
#Net short-wave radiation flux (surface)
'p3111' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 111 ;
	}
#Net long-wave radiation flux (surface)
'p3112' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 112 ;
	}
#Net short-wave radiation flux(atmosph.top)
'p3113' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 113 ;
	}
#Net long-wave radiation flux(atmosph.top)
'p3114' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 114 ;
	}
#Long wave radiation flux
'p3115' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 115 ;
	}
#Short wave radiation flux
'p3116' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 116 ;
	}
#Global radiation flux
'p3117' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 117 ;
	}
#Radiance (with respect to wave number)
'p3119' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 119 ;
	}
#Radiance (with respect to wave length)
'p3120' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 120 ;
	}
#Momentum flux, u-component
'p3124' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 124 ;
	}
#Momentum flux, v-component
'p3125' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 125 ;
	}
#Wind mixing energy
'p3126' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 126 ;
	}
#Image data
'p3127' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 127 ;
	}
#Percentage of vegetation
'vegrea' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 87 ;
	}
#Orography
'orog' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 7 ;
	 indicatorOfTypeOfLevel = 1 ;
	}
#Soil moisture
'sm' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 86 ;
	}
#Soil temperature
'st' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 85 ;
	}
#Snowfall water equivalent
'sf' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 65 ;
	}
#Total Cloud Cover
'tcc' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 71 ;
	}
#Total Precipitation
'tp' = {
	 table2Version = 1 ;
	 indicatorOfParameter = 61 ;
	 indicatorOfTypeOfLevel = 1 ;
	 level = 0 ;
}
