# (C) Copyright 2005- ECMWF.

# TEMPLATE 4.1101, Hovmoller-type grid with averaging or other statistical processing

# This template is experimental, was not validated at the time of publication and should be used only for bilateral previously agreed tests.
# (Octets 35-50 are very similar to octets 43-58 of product definition template 4.8, but the meaning of some fields differs slightly)
transient template_is_experimental = 1 : hidden;

include "grib2/template.4.parameter.def"
include "grib2/template.4.generating_process.def"
include "grib2/template.4.forecast_time.def"
include "grib2/template.4.horizontal.def"

unsigned[4] numberOfMissingInStatisticalProcess = 0  : edition_specific;
alias totalNumberOfDataValuesMissingInStatisticalProcess=numberOfMissingInStatisticalProcess;

codetable[1] typeOfStatisticalProcessing ('4.10.table',masterDir,localDir) : edition_specific;

codetable[1] typeOfTimeIncrement ('4.11.table',masterDir,localDir) = 2 : edition_specific;
alias typeOfTimeIncrementBetweenSuccessiveFieldsUsedInTheStatisticalProcessing=typeOfTimeIncrement;

codetable[1] indicatorOfUnitForTimeRange ('4.4.table',masterDir,localDir) =1 ;
unsigned[4] lengthOfTimeRange=0 ;
codetable[1] indicatorOfUnitForTimeIncrement ('4.4.table',masterDir,localDir)=255 ;
unsigned[4] timeIncrement=0 ;
alias timeIncrementBetweenSuccessiveFields=timeIncrement;

# include "grib2/template.4.statistical.def"
