# (C) Copyright 2005- ECMWF.

# TEMPLATE 4.1100, Hovmoller-type grid with no averaging or other statistical processing
# This template is experimental, was not validated at the time of publication
# and should be used only for bilateral previously agreed tests
transient template_is_experimental = 1 : hidden;

include "grib2/templates/template.4.parameter.def"
include "grib2/templates/template.4.generating_process.def"
include "grib2/templates/template.4.forecast_time.def"
include "grib2/templates/template.4.horizontal.def"
